MoYu AoSu V7 4x4 Replacement Center Stalk

Vendor: MoYu
Type: Accessories
Price: 1.99

This is a genuine replacement center stalk for the MoYu AoSu V7 4x4. It's designed to fit seamlessly into the core assembly, restoring optimal function and stability to your cube. Ideal for repairs or upgrades, this part ensures your AoSu V7 stays competition-ready.