MoYu WeiLong V11 Replacement Ball Core (20-Magnet)

Vendor: MoYu
Type: Accessories
Price: 6.99

The MoYu WeiLong V11 Replacement Ball Core (20-Magnet) is a direct swap for the original core in the 20-magnet version. It keeps your cube stable and aligned, just like the factory setup. Ideal if your core is damaged or worn out.