Blank Center Cap for YJ MGC3 Beta 3x3

Vendor: YJ
Type: Accessories
Price: 1.99

The Blank Center Cap for the YJ MGC3 Beta 3x3 is a clean, logo-free replacement cap designed for customization or competition use. Ideal for cubers who want to apply their own custom logos or need a logo-less cube for blindfolded solving, where logos are not permitted. These caps snap into place easily and match the factory color and texture of the original MGC3 Beta center caps.

Please note that this cap is not UV Coated.