Blank Center Cap for GAN12/13/14 UV

Vendor: GAN
Type: Accessories
Price: 1.99

The GAN 14 UV Blank Center Cap is a replacement cap for the GAN 14 UV 3x3. This one has no logo so it is great for blind solvers and/or people who like using their own logos!

Also compatible with newer GAN12 and GAN13 units