MoYu WeiLong V11 Replacement Ball-Core (8-Magnet)

Vendor: MoYu
Type: Accessories
Price: 5.99

The MoYu WeiLong V11 Replacement Ball Core (8-Magnet) is a factory replacement for the standard 8-magnet version. It helps maintain smooth, stable turning and is perfect for fixing a worn or broken core without changing how the cube feels.