MoYu WeiLong V10/V11 Replacement Cross Core

Vendor: MoYu
Type: Accessories
Price: 1.99

This is a replacement MoYu WeiLong V10/V11 Cross Core. It is compatible with the non-ball-core versions of the MoYu WeiLong WRM V10 3x3 and the MoYu WeiLong V11 3x3.